<script setup>
	/**
	 * name：
	 * user：sa0ChunLuyu
	 * date：2023年4月11日 17:56:51
	 */
	import {
		onShow
	} from '@dcloudio/uni-app'
	onShow(() => {
		uni.removeStorageSync('CHECK_LOGIN_TIME')
		uni.$lu.hospital()
		
	})
</script>

<style lang="scss">
	/*每个页面公共css */
	@import '@/uni_modules/uni-scss/index.scss';
	@import '@/common/uni.css';
	@import '@/static/customicons.css';
	@import "./static/css/animate.min.css";

	page {
		background-color: #f5f5f5;
	}

	.top_line_wrapper {
		width: 750rpx;
		height: 1rpx;
		background: #0DC3D0;
	}

	.example-info {
		font-size: 14px;
		color: #333;
		padding: 10px;
	}

	.opentype_button_wrapper {
		position: absolute;
		top: 0;
		bottom: 0;
		left: 0;
		right: 0;
		opacity: 0;
	}

	.primary_button_wrapper {
		position: relative;
		width: 580rpx;
		height: 90rpx;
		background: linear-gradient(90deg, #67b163, #529051);
		border-radius: 45rpx;
		font-size: 31rpx;
		font-weight: 500;
		color: #F6FDFD;
		line-height: 90rpx;
		text-align: center;
		margin: 200rpx auto 0;
		box-shadow: 0 0 50rpx #00000060;
	}

	.blank_wrapper {
		height: calc(20rpx + var(--safe-area-inset-bottom));
	}

	.top_blank_wrapper::after {
		content: ".";
	}

	.top_blank_wrapper {
		height: 0;
		width: 100%;
		opacity: 0;
	}

	.navbar_wrapper {
		height: calc(100rpx + var(--safe-area-inset-top));
	}
</style>